From e52a00fad93831dfd7cf6fe9cdec8e1aaa3c2ccb Mon Sep 17 00:00:00 2001
From: navewindre <boneyaard@gmail.com>
Date: Tue, 11 Nov 2025 08:57:25 +0100
Subject: fix

---
 web/src/sidebar.tsx | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'web/src/sidebar.tsx')

diff --git a/web/src/sidebar.tsx b/web/src/sidebar.tsx
index a1b3ad7..ee93706 100644
--- a/web/src/sidebar.tsx
+++ b/web/src/sidebar.tsx
@@ -25,7 +25,6 @@ function getWeatherCache() {
     const res = JSON.parse( localStorage.getItem( "weather" ) );
     return res;
   } catch( e ) {
-    console.log( e );
     return null;
   }
 }
@@ -57,7 +56,7 @@ function Weather() {
     const humi = weather.current.relative_humidity_2m;
     return <div id="weather">
       <div class="sidebar-row"><h4>weather in </h4> <h4>愛知県、日本:</h4></div>
-      <div class="sidebar-row"><h4>temperature:</h4><h4><span id="temp">{temp.toString()} </span>°C</h4></div>
+      <div class="sidebar-row"><h4>temperature:</h4><h4><span id="temp">{temp.toString()}</span>°C</h4></div>
       <div class="sidebar-row"><h4>wind speed:</h4><h4><span id="wind">{wind.toString()}</span>km/h</h4></div>
       <div class="sidebar-row"><h4>humidity:</h4><h4><span id="humi">{humi.toString()}</span>%</h4></div>
     </div>
-- 
cgit v1.2.3

